  366     2     1    2    -1    -1  14.0   2.0 100.0   0.0   0.0  420   17.5  0.20 0.20  3.80  2  0  0     0.00    3.80     5.30     8.80     1.10    1.60     2.80     2.80  0.00 0.00 
