  359     8     1    3    -1    -1  74.0   6.0  20.0 100.0  12.0  420   23.0  0.20 0.40 0.20  6.90  1  0  0     0.00    6.90    23.10    24.60   5.20  1  0  0     0.00    5.20    23.10    24.60  0.00 0.20 0.00 
