  68   1   9   1        6.8       6.0     160.0   12.0040  6.70   18.0010  6.95   18.0020  7.65   20.0080  6.90    8.1120  1.40   22.0020  7.65   22.0070  6.90   12.0020 11.00   12.0020  5.00   10.0020 10.20   12.0040 10.60   12.0040  5.60   12.0040  5.80
   8.0600  1.70   14.0030 11.30   14.0030 10.60    6.7170  0.70   14.0020  6.50   14.0010  6.00   14.0020 11.00   14.0060 12.00   12.0040  6.65   20.0020  7.55   22.0020  7.70    8.1180  1.60   25.0040  7.75   25.0020  6.90   14.0010  5.00   12.0040 10.30
  10.0020 10.40   12.0030 10.50    8.0700  2.70    8.0360  1.90   10.0010 550.0   12.0020 11.25   12.0010  9.20   12.0030 10.20   12.0010  3.00    6.0510  1.90   12.0060 12.00    8.0470  1.90   16.0020  4.00   16.0020  3.00   16.0140  2.50   16.0160  3.60
   6.1040  1.00    6.0240  0.90    8.0080  2.30    8.0080  1.50    8.0120  4.15    8.0080  1.90    8.0080  1.80    8.0080  2.30    8.0080  1.80    8.0080  2.00    8.0080  2.20    8.0120  4.40   10.0100  3.20    8.0110  3.80    8.0100  2.70    8.0110  4.00
   8.0100  2.80    8.0110  2.40    8.0080  2.70    8.0080  2.10    8.0120  4.10    8.0080  1.80    8.0040  1.7011 U. 12

Note: Lines longer than 256 characters were wrapped
