  76   1   5   1        5.6       8.0     350.0   12.0730  3.15   12.0630  2.40   10.1480  1.95   12.0080  3.35   12.0270  2.60   10.0160  2.05   12.0380  2.90    6.0450  0.75   10.0150  2.35    8.0800  1.65    8.0300  0.55    8.0300  1.05   10.0720  2.25
   8.0300  2.35    8.0240  1.10   12.0160  3.90   10.0220  1.95   10.0220  1.50   22.0050  5.00   12.0110  2.25   10.0080  1.00   12.0300  1.65   12.0330  1.50   10.0140  2.95   14.0030  3.50    8.0020  3.30   10.0040  4.00   10.0050  3.35   10.0050  3.45
   8.0040  3.50   12.0100  3.10    8.0280  2.10    8.0020  2.70   10.0040  2.00    8.0080  1.20   12.0060  2.50   12.0120  1.90   10.0040  4.00   10.0200  3.40    8.0040  3.40   10.0040  3.90    8.0600 11.00    8.0100  5.50    8.0100 10.00    8.0050 10.50
   8.0050 11.50    8.0520 12.00    8.0160  7.00    8.0050  7.50    8.0530  3.00   12.0240  3.00    8.0360  1.50    8.0180  1.60    8.0180  1.60   12.0020  4.20   16.0010  3.50   16.0010  3.60   16.0010  3.70   16.0010  3.80   16.0010  3.90   16.0010  4.00
  16.0010  4.10   16.0010  4.20    8.0310  1.40   12.0040  5.50   12.0040  1.80   16.0060  2.50    8.0400  0.90   12.0040  2.55   12.0040  2.10   12.0040  2.10    8.0180  0.90   20.0050  0.20   10.0240  2.45   14.0040  6.45   14.0010  5.6040 G

Note: Lines longer than 256 characters were wrapped
