   60    1    4    1        55.3        8.0      100.0    12.0300   3.00    12.0260   2.00     6.0900   1.00    10.0120   2.50     6.0120   0.80    10.0330   1.00    10.0040   3.05    10.0150   1.50    12.0020   2.75    12.0030   2.85    12.0040   2.55   
12.0070   3.50     8.0180   1.20     8.0320   1.40     8.0320   1.50    16.0120   3.60     8.0420   1.50     6.0280   0.40     6.0010   0.00     6.0010   0.00     6.0010   0.00     6.0010   0.00     6.0010   0.00    10.0040   2.40    10.0100   1.75     8.
060   0.95     8.1510   0.95    10.0040   1.85    10.0080   1.25    10.0020   2.80     6.0040   1.40    12.0180   2.90    12.0200   2.25     6.0010   0.00     6.0010   0.00     6.0010   0.00     8.0040   1.70    14.0020   1.40     8.0480   0.85    12.0040
  1.95    12.0080   1.35    14.0020   2.90    14.0050   2.25    14.0020   3.80    14.0050   3.20    10.0050   2.70    12.0050   2.20    10.0020   1.95    10.0040   1.35     8.0350   0.90    14.0030   4.00    16.0050   2.75    10.0160   1.45     8.0240   1
85    12.0230   4.80    12.0050   2.30    10.0020   2.70    10.0070   2.10     8.0090   1.15    12.0120   4.60

Note: Lines longer than 256 characters were wrapped
