  54   21.010 1111.000     1733.72   19.010 1101.000      300.00   18.010 1105.000      422.00   15.010 1301.000     5582.58   15.010 1303.000     2953.40   15.010 1307.000      176.99   14.010 1202.000      264.49   14.010 1204.000     2791.44   13.010 1
01.000       63.66   12.010 1802.130      169.91   11.010 1101.000      167.49    7.010 1601.065       41.00    7.010 1601.065       66.00    7.010 1806.130       91.00    7.010 1601.130      125.88    7.010 1111.000      406.80    7.010 1802.130      175
41    7.010 1111.000      158.46    7.010 1102.000      600.00    7.010 1102.000      900.00    7.010 1111.000     1457.00    7.010 1203.000     7618.96    7.010 1701.085      278.46    6.110  343.130    12000.00    5.010 1106.000     2800.50    5.010 180
.130      152.82    5.010 1208.000      659.21    5.010 1204.000      454.00    5.010 1102.000      900.68    5.010 1103.000      162.00    5.010 1102.000      637.81    5.010 1201.000     1150.00    5.010 1101.000     1710.00    6.110  342.130    20000.0
   15.030 1208.000        1.30   15.030 1103.000       45.34   20.010 1102.000      400.00   20.010 1302.000      719.32   13.040 1602.130       36.00   22.040 1202.000        2.20   28.040 1202.000      135.00   11.040 1806.130       60.00    8.040 1806.
30       55.00   12.040 1806.130       42.00    7.040 1802.130       42.37    5.040 1806.130      194.70   27.040 1806.130       40.00   28.040 1803.130       53.87    3.040 1901.130       65.50   13.040 1901.130      120.30   20.040 1901.130       89.80 
 14.040 1901.130       34.08   15.010 1103.000      600.00    7.010 1801.130      132.80   -85661.72   -90685.51    37023.79    32000.00        0.00        0.00        0.00        0.00      139.71       93.07       46.64        0.00      970.82        0.0
      970.82        0.00

Note: Lines longer than 256 characters were wrapped
